δ^{18}O_{GRIP} - δ^{18}O_{GISP2}

δ^{18}O_{NGRIP} - 1/2 ⋅ (δ^{18}O_{GRIP} + δ^{18}O_{GISP2})

GRIP GISP2 NGRIP

GISP2 accumulation anomaly

[Ca^{2+}] profiles different

NGRIP δ^{18}O high

GISP2 & GRIP δ^{18}O different

GI-1 GS-2 GI-2 GS-3 GI-3 GI-4 GS-5 GI-5

GS-3 dust peaks

12 14 16 18 20 22 24 26 28 30 32

-3 -2 -1 -1 0 1

GICC05 age (ka b2k)

Δδ18O (permil)

-44 -42 -40 -38 -36 δ18O (permil)

1500 1550 1600 1650 1675 1700 1725 1750 1775 1800 1825 1850 1875 1900 1925

12.5 25 50 100 200 400 800

NGRIP depth (m)

[Ca2+] (ppb)

Supplementary information to the article: Rasmussen, S.O., et al., Synchronization of the NGRIP, GRIP, and GISP2 ice cores across MIS 2 and palaeoclimatic implications. Quaternary Science Reviews vol. 27, p. 18-28, 2008, doi:10.1016/j.quascirev.2007.01.016.